[rad] ϕΔ 0 2 4

)ϕΔ C(

0.99

0.995 1 1.005

1.01

1.015

Pb-Pb 2.76 TeV, 0-2% central < 2.5 GeV/c t T 2 < p

< 2 GeV/c a T 1.5 < p | < 1.8 ηΔ 0.8 < |

/ndf = 33.3 / 35 2χ

[rad] ϕΔ 0 2 4 ratio

0.998 1 1.002